UTFALL PLACERAS UT ÖVER KANTEN 3MM

TEXT & BILD
DETTA DOKUMNET HAR EN MARGINAL PÅ 5 MM OCH UTFALL PÅ 3 MM
BAKSIDA

TEXT & BILD
DETTA DOKUMNET HAR EN MARGINAL PÅ 5 MM OCH UTFALL PÅ 3 MM
FRAMSIDA

UPPSLAG
DETTA DOKUMNET HAR EN MARGINAL PÅ 5 MM OCH UTFALL PÅ 3 MM